; module-definition file for generic -- used by LINK.EXE

NAME	     Client	   ; application's module name

DESCRIPTION  'Sample Microsoft Windows RPC Application'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024
STACKSIZE    5120	   ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	MainWndProc   @1   ; name of window processing function
	About	      @2   ; name of "About" processing function
	GetBindInfo   @3   ; name of "GetBindInfo" processing function
	GetWaitInfo   @4   ; name of "Wait" processing function
	GetYieldInfo  @5   ; name of "Yield" processing function
	CustomYield   @6   ; parameter to RpcSetYieldInfo
