; module-definition file for generic -- used by LINK.EXE

NAME          ICMTEST    ; application's module name

DESCRIPTION   'Sample Microsoft Windows Application'

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024
STACKSIZE    8192


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
  MainWndProc             @1  ; name of window processing function
  dlgprcAbout             @2  ; name of "About" processing function
  dlgprcDefineColorSpace  @3  ;
  dlgprcAddLCS            @4  ;
  PrintDlgProc            @5  ;
  EnumICMProfilesCallback @6  ; enumerates gamut matching methods
  AbortProc               @7  ;
