NAME    Server

DESCRIPTION 'Sample Microsoft Windows Application'

EXETYPE WINDOWS

STUB    'WINSTUB.EXE'

CODE	PRELOAD MOVEABLE DISCARDABLE

DATA	PRELOAD MOVEABLE MULTIPLE

HEAPSIZE  1024
STACKSIZE 8192

EXPORTS
    MainWndProc      @1
    DDEWndProc	     @2
    AboutDlgProc     @3
