NAME		PENAPP

DESCRIPTION	'Microsoft Sample Recognizer App: Version 1.0'
EXETYPE		WINDOWS
PROTMODE
STUB		'WINSTUB.EXE'

CODE 		MOVEABLE DISCARDABLE LOADONCALL PURE
DATA 		PRELOAD MOVEABLE MULTIPLE

HEAPSIZE	3072
STACKSIZE	8096

SEGMENTS
	_TEXT	PRELOAD

EXPORTS
	MainWndProc		@1
	InputWndProc		@2	
	InfoWndProc		@3
	RawWndProc		@4	

IMPORTS
	; can be removed when compiling with Windows 3.1 libraries
;;;	GetMessageExtraInfo	= USER.288	

